Roman Kings

Roman Kings

King | Reign | Years
Romulus | 754 to 717 | 37
Numa Pompilius | 717 to 674 | 43
Tullius Hostilius | 674 to 642 | 32
Ancus Marcius | 642 to 618 | 24
Lucius Tarquinius Priscas | 618 to 579 | 39
Servius Tullius | 579 to 535 | 44
Tarquinius Superbus | 535 to 510 | 25
REPUBLIC | 510 to 49 BC |
TRANSITION | 49 to 27 BC |
PRINCIPATE | 27 to — |